\title{A2: Measurement}
\input{preamble.tex}

I got some really wierd behaviour from
\texttt{std::this\_thread::sleep\_for()} and even a crash and ended up
having to go back to using \texttt{\#include} instead of modules, which
solved the issues.


\end{document}
